<div id="heading"><h3 class="berschrift3"><a name="mod_1547477857516_0001"></a><a name="text_mod_1547477857516_0001"></a><a name="_Toc227140518"></a>Installation of the variant x-times with bayonet axial screw connection</h3></div><p class="dlModulbegrenzung0"> </p><div><table cellspacing="0" style="border-collapse:collapse;margin-left:-141.75pt;table-layout:fixed;width:459.25pt;"><colgroup><col style="width:141.75pt;"><col style="width:28.35pt;"><col style="width:289.15pt;"></colgroup><tr style="height:26.3pt;"><td style="padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="HMarginalie"> </p></td><td style="background-color:transparent;padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="Tabelleberschrift"><img alt="Grafik 16" height="26" src="images/image_4.png" width="30"></p></td><td style="background-color:#DDDDDD;padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="HHinweisfett">INFORMATION</p><p class="HText">Initial installation of the changing part with bayonet is in accordance with the variant with an x-times axial screw connection, see »Installation of x-times variant with axial screw connection«.</p><p class="HText">After initial installation, the changing part fixing screws remain in the clamping device.</p></td></tr></table></div><p class="HTabellenende"> </p><p class="dlModulbegrenzung0"> </p><div><table cellspacing="0" style="border-collapse:collapse;margin-left:-141.75pt;table-layout:fixed;width:459.25pt;"><colgroup><col style="width:141.75pt;"><col style="width:317.5pt;"></colgroup><tr style="height:7.1pt;"><td style="padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="HZwischenraum" style="line-height:1.15em;"> </p></td><td style="padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="HGrafik" style="line-height:1.15em;"><span style="font-family:Times New Roman;font-size:12.0pt;"><img height="302" src="images/image_64.png" width="415"></span></p></td></tr></table></div><p class="dlTabellezusammenhalten"> </p><p class="dlModulbegrenzung0"> </p><p class="dlModulbegrenzung0"> </p><ol class="hb-list hb-list--decimal"><li class="hb-list__item">Place the changing part on the product so that the screw head on the changing part fixing screw fits through the bayonet opening.</li></ol><div><table cellspacing="0" style="border-collapse:collapse;margin-left:-141.75pt;table-layout:fixed;width:459.25pt;"><colgroup><col style="width:141.75pt;"><col style="width:317.5pt;"></colgroup><tr style="height:7.1pt;"><td style="padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="HZwischenraum" style="line-height:1.15em;"> </p></td><td style="padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="HGrafik" style="line-height:1.15em;"><span style="font-family:Times New Roman;font-size:12.0pt;"><img height="302" src="images/image_65.png" width="415"></span></p></td></tr></table></div><p class="dlTabellezusammenhalten"> </p><p class="dlModulbegrenzung0"> </p><p class="dlModulbegrenzung0"> </p><ol class="hb-list hb-list--decimal"><li class="hb-list__item">Twist the changing part until firmly home.</li></ol><div><table cellspacing="0" style="border-collapse:collapse;margin-left:-141.75pt;table-layout:fixed;width:459.25pt;"><colgroup><col style="width:141.75pt;"><col style="width:317.5pt;"></colgroup><tr style="height:7.1pt;"><td style="padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="HZwischenraum" style="line-height:1.15em;"> </p></td><td style="padding:2.85pt 2.85pt 2.85pt 2.85pt;"><p class="HGrafik" style="line-height:1.15em;"><span style="font-family:Times New Roman;font-size:12.0pt;"><img height="302" src="images/image_66.png" width="415"></span></p></td></tr></table></div><p class="dlTabellezusammenhalten"> </p><p class="dlModulbegrenzung0"> </p><p class="dlModulbegrenzung0"> </p><ol class="hb-list hb-list--decimal"><li class="hb-list__item">Screw in the changing part fixing screws and tighten to the specified tightening torque [see »Screw tightening torques« chapter].</li></ol>